en	An authentication exception occurred.
uz	Autentifikatsiyada xatolik.

en	Authentication credentials could not be found.
uz	Autentifikatsiya ma'lumotlari topilmadi.

en	Authentication request could not be processed due to a system problem.
uz	Tizimdagi muammo tufayli autentifikatsiya so'rovi bajarilmadi.

en	Invalid credentials.
uz	Noto'g'ri ma'lumot.

en	Cookie has already been used by someone else.
uz	Cookie faylini allaqachon kimdir ishlatgan.

en	Not privileged to request the resource.
uz	Sizda ushbu manbani talab qilishga ruxsat yo'q..

en	Invalid CSRF token.
uz	Noto'g'ri CSRF belgisi.

en	No authentication provider found to support the authentication token.
uz	Haqiqiylikni tasdiqlovchi belgini qo'llab-quvvatlovchi biron bir autentifikatsiya provayderi topilmadi.

en	No session available, it either timed out or cookies are not enabled.
uz	Sessiya topilmadi, muddati tugamadi yoki cookie-fayllar yoqilmagan.

en	No token could be found.
uz	To'ken topilmadi.

en	Username could not be found.
uz	Foydalanuvchi nomi topilmadi.

en	Account has expired.
uz	Akkunt muddati tugagan.

en	Credentials have expired.
uz	Autentifikatsiya ma'lumotlari muddati tugagan.

en	Account is disabled.
uz	Akkunt o'chirilgan.

en	Account is locked.
uz	Akkunt bloklangan.

en	Too many failed login attempts, please try again later.
uz	Kirish urinishlari muvaffaqiyatsiz tugadi, keyinroq qayta urinib ko'ring.

en	Invalid or expired login link.
uz	Kirish havolasi yaroqsiz yoki muddati tugagan.

en	Too many failed login attempts, please try again in %minutes% minute.
uz	Kirish uchun muvaffaqiyatsiz urinishlar, %minutes% daqiqadan so'ng qayta urinib ko'ring.